Cover Letter for POLYCENTER Software Installation Utility for OpenVMS VAX

May 2000

Dear OpenVMS Customer,

The VMS62TO71_PCSI V2.0 remedial kit updates the POLYCENTER Software Installation utility for OpenVMS VAX, including associated command procedures and help text. After installation of this kit, the POLYCENTER Software Installation utility will be functionally equivalent to that provided by OpenVMS VAX V7.2 with the addition of several corrections to the utility. The �le name of the kit is DEC-VAXVMS-VMS62TO71_PCSI-V0200�4.PCSI.

This remedial kit can be applied to OpenVMS VAX V6.2 and V7.1 systems. To install it, enter a command similar to the following:

$ PRODUCT INSTALL VMS62TO71_PCSI /SOURCE=dev:[dir]

No reboot is required after successful installation of this kit. However, you will need to log out and then log on again before using the PRODUCT command.

For more information about this remedial kit, please read the release notes. The release notes are placed in SYS$HELP: during installation, but you can extract the �le from the remedial kit for viewing prior to installation. To copy the release notes from the kit to your default directory, enter a command similar to the following:

$ PRODUCT EXTRACT RELEASE_NOTES VMS62TO71_PCSI /SOURCE=dev:[dir]

Important Note About Reverting to Prior Versions After installaton of this remedial kit your system will use the new features provided by this version of the POLYCENTER Software Installation utility. If a layered product is installed that makes use of this new functionality, then it may not be possible to revert back to an older version of the utility. This restriction occurs because there may be records in the software product database that the older version of the utility will not be able to interpret.

© 2000 Compaq Computer Corporation

� OpenVMS and VAX are trademarks of Compaq Computer Corporation.