AV-Q7T0J-TE

October 2002

Dear Disk File Optimizer (DFO) customer:

DFO for OpenVMS V2.7 runs on OpenVMS VAX versions 6.2, 7.1, 7.2 and 7.3, and OpenVMS Alpha versions 6.2, 7.1-2, 7.2-1, 7.2-2, 7.3 and 7.3-1. DFO no longer quali�es OpenVMS VAX version 5.5-2.

Through customer feedback and suggestions, the Disk File Optimizer software continues to improve.

The main purpose of DFO V2.7 is to extend the compatibility of our product to include the new release of OpenVMS 7.3-1 and to update our general DFO audience with current bug �xes. See release notes for listing.

A full documentation set has been included as part of the binary kit. PDF format is used as most customer have readers that allow them to view this format on line for ease of use.

Once again, thank you for your purchase of this product.

Sincerely,

OpenVMS Product Management CXOSWPM@hp.com © 2002 Compaq Information Technologies Group, LP.