SoftwareProductDescription_{PRODUCT NAME: DEC InfoServer Client for VMS, Version 1.0}

SPD 33.91.01DESCRIPTION

DEC InfoServer Client for VMS enables VAX systems running the VMS Operating System to access the InfoServer 100 Ethernet-based virtual disk server.

The InfoServer 100 is an Ethernet-based, high performance virtual disk server. Physical disk media and sets of logical disk blocks can be served to the network by the InfoServer. Host systems running the appropriate client software can connect to the virtual disks served by the InfoServer 100 and use them as though they were locally attached devices.

DEC InfoServer Client for VMS is used by VMS client systems to install or upgrade software using the Info- Server 100-based media, access on-line documentation via the Bookreader with the InfoServer 100 as its data source, or access any other CDROM-based data with a disk format supported by VMS. Software product installations or upgrades must be supported by the version of VMS running on your system. The VMS Operating System can only be upgraded to VMS V5.4 or later from an InfoServer disk.

Although the InfoServer 100 supports read-write access, this kit is restricted to providing read-only support to the InfoServer 100. VMS V5.4 supports read-write access to InfoServer 100. This kit can be used to upgrade to VMS V5.4, which is packaged with the full read-write InfoServer Client software.

The InfoServer Client Software is part of VMS V5.4 and later releases of VMS. When a system is upgraded to VMS V5.4, InfoServer Client Software packaged with VMS V5.4 and later will supersede this product and is fully supported by Software Product Services as part of VMS Software Product Services.HARDWARE REQUIREMENTS

VAX, MicroVAX, VAXstation, or VAXserver con�guration as speci�ed in the System Support Addendum (SSA 33.91.01-x).SOFTWARE REQUIREMENTSFor Systems Using Terminals (No DECwindows Interface):VMS Operating SystemFor Workstations Running VWS:VMS Operating SystemFor Workstations Running DECwindows:VMS Operating System (and necessary components of VMS DECwindows)Refer to the System Support Addendum (SSA 33.91.01- x) for availability and required versions of prerequisite software and for information regarding components of VMS DECwindows.ORDERING INFORMATIONSoftware Media: QA-GGWA*-**Software Documentation: QA-GGWA*-GZThe InfoServer 100 includes four Access Licenses. Additional Access Licenses should be purchased for clients exceeding this number (4). The InfoServer Client Access License grants the right to access the InfoServer 100 by one client node.InfoServer Access Licenses: QL-YTC99-AAJanuary 1991 AE-PF8RB-TE dt

DEC InfoServer Client for VMS, Version 1.0 SPD 33.91.01

SOFTWARE LICENSING

The license options for the VMS Operating System include the right to use InfoServer Client for VMS.

For your �rst installation of this software product, you must purchase as a minimum for each system:

� Single-Use License Option (VMS Operating System

License. Refer to the VMS Operating System Software Product Description, SPD 25.01.xx.)

This software is furnished under the licensing provisions of Digital Equipment Corporation’s Standard Terms and Conditions. For more information about Digital’s licensing terms and policies, contact your local Digital of�ce.

SOFTWARE PRODUCT SERVICES

This product has per-call consulting available.

The intent of the product is to allow customers access to the InfoServer 100 to install and/or upgrade to VMS V5.4, where they can use the full functionality of the InfoServer 100.

A variety of service options are available from Digital. For more information, contact your local Digital of�ce.

SOFTWARE WARRANTY

Warranty for this software product is provided by Digital with the purchase of a license for the product as de�ned in the Software Warranty Addendum of this SPD.

� The DIGITAL Logo, CI, DEC, DECwindows, MicroVAX, VAX, VAXcluster, VAXft, VAXserver, VAXstation, and VMS are trademarks of Digital Equipment Corporation.

2