Compaq NAS Packages Version 8.3A for OpenVMS Systems

Read Before Installing

Thank you for your interest in Compaq NAS Packages Version 8.3A. Compaq NAS Packages Version 8.3A documents component software support for Compaq OpenVMS Operating System Version 7.3- 1. Please see the NAS Software Product Descriptions (SPDs) or the NAS Installation guide for more information on the components.

The NAS Packages provide licenses for client/server enabling software, including:

� Licenses to use selected component products

� NAS Packages documentation

The purchase of a NAS license authorizes the use versions of NAS component products shipping in the calendar quarter when the NAS license was purchased. Component update licenses or NAS update services may be purchased for use of later versions of any component.

The Compaq NAS Packages components are available as separate kits on the OpenVMS Alpha and OpenVMS VAX Software Products Libraries (SPLs). See the SPL Master Indexes for the location of the NAS components, and see the corresponding Online Documentation Library (ODL) Master Indexes for the location of online documentation. These Master Indexes are also in the [README] directory on disc 1 of both the SPL and ODL. Some component kits may also be available as separate independent product offerings.

Technical considerations for all NAS Packages Customers

To successfully install the components that make up your NAS Packages, please read the instructions in the Compaq NAS Packages for OpenVMS Alpha Systems Installation Guide, which outlines the following procedures:

� Loading your Product Authorization Key (PAK)

� Installing the Compaq NAS Packages Base Kit (optional)

� Installing the Compaq NAS components and rebooting as necessary.

See the Software Product Description (SPD) and the Compaq NAS Packages Installation Guide for a complete list of the components for each NAS package. See "Installing a NAS Package: At a Glance," a checklist in Chapter 2 of the Installation Guide, for a simple summary of the NAS installation procedures.

The Compaq NAS Version 8.3A documentation has been delivered to you in online form. The Compaq NAS Packages provide documentation in Bookreader, PostScript, and ASCII formats.

Thank you for your interest in OpenVMS and its associated layered products.

©2002, Compaq Information Technologies, L.P.

Compaq, the Compaq logo, ACMS, All-In-1, CDA, DECforms, DECintact, InfoServer, LinkWorks, Mailbus, MicroVAX, PolyCenter, StorageWorks, ULTRIX, VAX, VAXELN, and VMS are Registered in the U.S. Patent and Trademark Of�ce.

BASEstar, Datatrieve, and OpenVMS are trademarks of Compaq Information Technologies Group.

All other product names mentioned herein may be trademarks or registered trademarks of their respective companies.