ALL-IN-1/Hangul for OpenVMS/Hangul V3.2 Read Me First

July 1996 Before you install ALL-IN-1/Hanyu V3.2, please perform the following. 1. Check that your have all the items as listed in the Bill of Material. 2. Ensure that your system has OpenVMS/Hangul V6.1 or its higher version installed.

3. Read the standard ALL-IN-1 V3.2 Installation Guide as well as the ALL-IN- 1/Hangul V3.2 Installation Guide. You should also read the Overview and Planning document before you install ALL-IN-1/Hangul V3.2.

4. Check that you have the correct Product Authorization Key (PAK) registered and loaded before you install ALL-IN-1/Hangul V3.2, otherwise the installation will fail.

5. Read the ALL-IN-1/Hangul V3.2 Release Notes for new features since version 3.0. 6. If you have any question concerning ALL-IN-1/Hangul V3.2, please contact your local Digital support channel.

Order Number: AV-QW5QA-TE